\documentstyle[twoside]{article}

\input ibvs2.sty
\input ibvse.sty

\begin{document}
\IBVShead{6130}{7 February 2015}

\IBVStitle{New Times of Minima of Some Eclipsing Variables}

\IBVSauth{Lacy, C.H.S.}

\IBVSinsto{Department of Physics, University of Arkansas, Fayetteville, Arkansas 72701, USA; e-mail: clacy@uark.edu}

\IBVStyp{ Binaries: eclipsing }
\IBVSkey{CCD photometry}


\begintext


\IBVSEobs{NFO WebScope near Silver City, NM, USA ({\tt www.nfo.edu}); 24-inch classical Cassegrain.} 

\IBVSEdet{$2102\times2092$ pixels Kodak KAF 4300E CCD cooled to (typ.) $-20$ C; 0.78 arcsec square pixels; 27' square field of view, used with a Bessell V filter.}

\IBVSEred{Virtual measuring engine (Multi-Measure 2.2) written by C.H.S. Lacy (2013).}

\IBVSEmethod{Kwee \& van Woerden (1956)}

\IBVSEmins{
BX CMi         &  56715.7056   &  0.0004   & II &&\\
               &  56738.7331   &  0.0004   & II &&\\
               &  56748.7117   &  0.0002   & I &&\\
               &  56978.9737   &  0.0004   & II &&\\
               &  57018.8873   &  0.0005   & II &&\\
               &               &           &   &&\\
V361 Cas       &  56942.6282   &  0.0014   & II &&\\
               &  56953.6917   &  0.0005   & I &&\\
               &  56980.7270   &  0.0004   & I &&\\
               &               &           &   &&\\
}

\IBVSEmins{
LO Gem         &  56969.7755   &  0.0005   & I &&\\
               &  56980.9620   &  0.0006   & I &&\\
               &  56988.7958   &  0.0003   & II &&\\
               &               &           &   &&\\
V501 Her       &  56731.9059   &  0.0005   & I &&\\
               &               &           &   &&\\
NS Mon         &  56722.6555   &  0.0004   & I &&\\
               &  56746.6503   &  0.0005   & II &&\\
               &               &           &   &&\\
V501 Mon       &  56697.7380   &  0.0009   & II &&\\
               &               &           &   &&\\
NP Per         &  56955.7795   &  0.0021   & II &&\\
               &               &           &   &&\\
V514 Per       &  56706.6769   &  0.0008   & II &&\\
               &               &           &   &&\\
AQ Tau         &  56971.8104   &  0.0009   & II &&\\
               &  56977.8890   &  0.0009   & I &&\\
               &               &           &   &&\\
TYC 1077-828-1 &   56915.7467  &   0.0003  & I &&\\
               &  56956.6792   &  0.0003   & I &&\\
               &               &           &   &&\\
TYC 1323-169-1 &   56736.6603  &   0.0003  & II &&\\
               &  56942.9212   &  0.0005   & I &&\\
               &               &           &   &&\\
TYC 279-35-1   &   56724.8131  &   0.0003  & I &&\\
               &               &           &   &&\\
TYC 4985-74-1  &   56715.9012  &   0.0002  & II &&\\
               &               &           &   &&\\
TYC 5085-1264-1&   56827.6753  &   0.0007  & I &&\\
               &               &           &   &&\\
TYC 54-504-1   &   56925.8056  &   0.0005  & II &&\\
               &  56943.8918   &  0.0005   & II &&\\
               &               &           &   &&\\
TYC 687-1139-1 &   56985.8619  &   0.0008  & I &&\\
               &               &           &   &&\\
TYC 740-8-1    &   56717.7548  &   0.0002  & II &&\\
               &  56982.9923   &  0.0002   & I &&\\
               &               &           &   &&\\
TYC 950-560-1  &   56733.9612  &   0.0004  & I &&\\
               &  56738.8895   &  0.0004   & I &&\\
               &  56746.9011   &  0.0008   & II &&\\
               &  56754.9128   &  0.0006   & I &&\\
               &  56764.7733   &  0.0007   & I &&\\
               &  56772.7835   &  0.0013   & II &&\\
               &  56780.7956   &  0.0003   & I &&\\
}


\IBVSEack{Construction and operation of the NFO telescope were partially funded by the National Science Foundation, the Arkansas Center for Space and Planetary Sciences, the NASA Arkansas Space Grant Consortium, the University of Arkansas, Fayetteville, the University of Arkansas at Little Rock, and the Harvard-Smithsonian Center for Astrophysics. We are grateful to Dr. Bill Neely for initial processing of the images and construction, maintenance, and operation of the NFO equipment and software.}

\reference

Kwee, K. K. \& van Woerden, H. 1956, {\it BAN}, {\bf 12}, 327

\endreferences

\end{document}


