\documentstyle[twoside,epsf]{article}

\input ibvs2.sty

\input ibvst.sty

\begin{document}

\IBVShead{4979}{31 October 2000}

\IBVStitletl{Broad Band Photometry of CG Cygni}

\IBVSauth{Af\c{s}ar, M.; \.{I}bano\v{g}lu, C.}

\IBVSinsto{Ege University Observatory, 35100 Bornova, Izmir, Turkey\\ \indent
email: afsar@astronomy.sci.ege.edu.tr, ibanoglu@astronomy.sci.ege.edu.tr}

\SIMBADobj{CG Cyg}

\begintext

\IBVSTnam{CG Cyg = BD\,+34\deg4217}

\IBVSTcoo{20\hr 58\mm 13\fsec50}{35\deg 10\farcm5}{2000}

\IBVSTobs{Ege University Observatory, 48-cm Cassegrain telescope}

\IBVSTdet{Hamamatsu, R4457 (PMT)}

\IBVSTfil{$B$, $V$ and $R$ filters of Johnson $UBV$ system}

\IBVSTcomp{BD\,+34\deg4216}

\IBVSTdata{Upon request}

\IBVSTtyp{ RS CVn }

\IBVSTrem{
We obtained the wide band photometry of CG Cygni at Ege University Observatory. In Figure~1 we show the $V$-band light curve of the system
obtained in June-July 2000.}

\IBVSTack{
The authors would like to thank Dr.~S. Evren, A. Devlen and G. Ta\c{s} for their assistance during the observations.}

\IBVSfig{12cm}{4979-f1.ps}{The $V$-band light curve of CG Cyg}

\end{document}
