\documentstyle[twoside]{article}

\input{ibvs2.sty}

\begin{document}

\IBVShead{4770}{13 September 1999}

\IBVStitletl{New Variable Stars Discovered in the MISAO Project }{ II: M\lowercase{is}V0101--M\lowercase{is}V0150}

\IBVSauth{Seiichi Yoshida$^1$, KenIchi Kadota$^2$, Taichi Kato$^3$}

\IBVSinst{MISAO Project, 1065-16 Miyawada Fujishiro-machi Kitasoma-gun Ibaraki 300-1514, Japan,\\ \indent e-mail: seiichi@muraoka.info.waseda.ac.jp}
\IBVSinst{MISAO Project, 77-1-3-12-204 Koshikiya Ageo City Saitama 362-0064, Japan,\\ \indent e-mail: kenic-k@astroarts.co.jp}
\IBVSinst{Dept.\ of Astronomy, Kyoto University, Kyoto 606-8502, Japan, e-mail: tkato@kusastro.kyoto-u.ac.jp}

\IBVSabs{This report describes 50 new variable stars (MisV0101-MisV0150)}
\IBVSabs{discovered in the course of the MISAO Project.}

\begintext

This report describes 50 new variable stars (MisV0101--MisV0150)
discovered in the course of the MISAO Project.

These objects are detected automatically by the PIXY system as
candidates of variable stars from unfiltered CCD images taken by Kadota
between 1999 March and August, then confirmed by Yoshida and Kadota.
Further details are same as described in Yoshida and Kadota (1999).

The list of 50 new variable stars is given in Table~1. The position and magnitude are measured with USNO-A1.0 catalog. The magnitude is based on a preliminary {\it V} magnitude calculated from {\it R} and {\it B} magnitude in the catalog based on Kato's (1998) equation:
\[
V = R + 0.375 (B - R)
\]
The finding charts are available electronically as 4770-f$[nnn]$.eps where $[nnn]$ refers to the serial number assigned to the star in the first column of Table~1.

MisV0120 is 54 arcsec from V1465 Cyg, a rapidly changing irregular
variable, at R.A.~20\hr01\mm49\fsec98, Decl.~+33\deg14\arcm24\farcs3
(2000.0) in the GCVS\@. But MisV0120 is identified with IRAS 20000+3305, so it is probably Mira type or semi-regular type. Considering the large distance and the type difference, we concluded that MisV0120 is another new variable star.
However, no star brighter than 14.6 mag was detected on our unfiltered
CCD images taken on JD 2451299.20, 2451367.18, 2451392.11 and 2451394.16 at the position of V1465 Cyg. Therefore, it cannot be completely ruled out that the position of V1465 Cyg is inaccurate and MisV0120 is identical with V1465 Cyg.

MisV0130 is identified with HS 1332, one of the variable stars
discovered by FASTT, Flagstaff Astrometric Scanning Transit Telescope
(cf.\ Henden and Stone 1998).

NSV 11661 is 1.7 arcmin from MisV0134. No star brighter than 15.2 mag was detected at the position of NSV 11661 on our unfiltered CCD images taken on JD 2451298.21, 2451330.22 and 2451367.17. However, considering the large angular distance, MisV0134 is probably another variable object.

\newpage

\references

Henden, A. A., Stone, R. C., 1998, {\it AJ}, {\bf 115}, 296

Kato, T., 1998, \\ {\tt http://www.kusastro.kyoto-u.ac.jp/vsnet/Mail/vsnet-chat/msg00700.html}

Yoshida, S., Kadota, K., 1999, {\it IBVS}, No.\,4746

Yoshida, S., 1999, in preparation

\endreferences

\vfil

\normalsize

\begin{center}
Table 1: List of New Variable Stars
\vskip2mm
\begin{tabular}{crrrrcl} \hline
Code & \multicolumn{2}{c}{R.A. (J2000.0) Decl.} & 
\multicolumn{2}{c}{\begin{tabular}{c} Unfiltered \\ CCD Mag. \\ Max \hfill Min \end{tabular}} & 
Type & Identified with \\ \hline
MisV0101 & 18\hr59\mm20\fsec75 & +11\deg38\arcm53\farcs3 & 13.7 & [15.1 & ? & \\
MisV0102 & 20 02 07.62 & +35 23 24.2 & 13.8 & [15.0 & ? & \\
MisV0103 & 20 57 03.25 & +44 56 16.0 & 14.0 & 15.3 & ? & \\
MisV0104 & 19 58 09.93 & +34 14 51.4 & 11.9 & 13.5 & ? & USNO-A1.0 1200.14207004 \\
MisV0105 & 20 57 03.21 & +39 16 51.9 & 11.9 & 13.0 & ? & \\
MisV0106 & 21 00 37.23 & +37 28 54.8 & 12.6 & 14.0 & ? & USNO-A1.0 1200.17031953 \\
MisV0107 & 21 03 40.38 & +43 40 18.8 & 12.3 & 13.6 & ? & \\
MisV0108 & 19 02 22.55 & +19 56 55.9 & 11.8 & 13.6 & ? & USNO-A1.0 1050.12897426 \\
\multicolumn{6}{c}{} & IRAS 19002+1952 \\
MisV0109 & 18 59 40.03 & +19 30 10.0 & 12.7 & 14.2 & ? & IRAS 18574+1925 \\
MisV0110 & 18 59 38.64 & +19 58 59.7 & 10.9 & 12.7 & ? & IRAS 18574+1954 \\
MisV0111 & 18 57 29.84 & +20 05 27.3 & 10.5 & 11.7 & ? & IRAS 18553+2001 \\
MisV0112 & 18 59 12.58 & +20 14 38.5 & 11.6 & 13.5 & ? & USNO-A1.0 1050.12690142 \\
\multicolumn{6}{c}{} & IRAS 18570+2010 \\
MisV0113 & 19 01 09.49 & +15 38 57.0 & 11.6 & 13.3 & ? & IRAS 18588+1534 \\
MisV0114 & 18 59 06.54 & $-$00 00 44.6 & 13.8 & [14.8 & ? & IRAS 18565-0004 \\
MisV0115 & 19 01 18.95 & +20 33 31.3 & 12.3 & 13.3 & ? & GSC 1593.0681 \\
\multicolumn{6}{c}{} & USNO-A1.0 1050.12825355 \\
\multicolumn{6}{c}{} & IRAS 18591+2029 \\
MisV0116 & 19 01 13.17 & +10 42 55.1 & 10.4 & 11.9 & ? & USNO-A1.0 0975.14088010 \\
\multicolumn{6}{c}{} & IRAS 18588+1038 \\
MisV0117 & 19 00 32.83 & +11 36 11.6 & 10.6 & 11.4 & ? & USNO-A1.0 0975.14055676 \\
\multicolumn{6}{c}{} & IRAS 18581+1131 \\
MisV0118 & 18 57 21.59 & +18 53 51.8 & 11.6 & 12.4 & ? & USNO-A1.0 1050.12566015 \\
\multicolumn{6}{c}{} & IRAS 18551+1849 \\
MisV0119 & 20 03 03.17 & +31 12 43.8 & 10.2 & 11.3 & ? & USNO-A1.0 1200.14506260 \\
\multicolumn{6}{c}{} & IRAS 20010+3103 \\
MisV0120 & 20 01 54.11 & +33 14 07.6 & 12.0 & 13.1 & ? & USNO-A1.0 1200.14440980 \\
\multicolumn{6}{c}{} & IRAS 20000+3305 \\
MisV0121 & 18 59 13.76 & +16 54 47.2 & 12.6 & 13.8 & ? & USNO-A1.0 1050.12691375 \\
MisV0122 & 20 56 38.73 & +32 56 05.9 & 11.6 & 12.8 & ? & GSC 2692.1817 \\
\multicolumn{6}{c}{} & USNO-A1.0 1200.16805212 \\
\multicolumn{6}{c}{} & IRAS 20545+3244 \\
MisV0123 & 20 02 56.93 & +38 07 49.1 & 12.6 & 13.7 & ? & USNO-A1.0 1275.13401299 \\
MisV0124 & 19 02 27.83 & +18 12 36.4 & 12.3 & 13.1 & ? & USNO-A1.0 1050.12903675 \\
\multicolumn{6}{c}{} & IRAS 19002+1808 \\
MisV0125 & 19 00 08.87 & +18 24 48.1 & 12.7 & 13.7 & ? & USNO-A1.0 1050.12748967 \\
\hline
\end{tabular}
\end{center}

\newpage

\begin{table}
\begin{center}
Table 1 (cont.)
\vskip2mm
\begin{tabular}{crrrrcl} \hline
Code & \multicolumn{2}{c}{R.A. (J2000.0) Decl.} & 
\multicolumn{2}{c}{\begin{tabular}{c} Unfiltered \\ CCD Mag. \\ Max \hfill Min \end{tabular}} & 
Type & Identified with \\ \hline
MisV0126 & 19\hr 56\mm 49\fsec 94 & +31\deg 43\arcm 10\farcs 0 & 12.3 & 13.4 & ? & USNO-A1.0 1200.14114676 \\
\multicolumn{6}{c}{} & IRAS 19548+3135 \\
MisV0127 & 19 00 59.36 & +13 57 36.6 & 12.4 & 13.6 & ? & USNO-A1.0 0975.14076767 \\
\multicolumn{6}{c}{} & IRAS 18586+1353 \\
MisV0128 & 19 58 14.84 & +35 43 22.1 & 12.4 & 13.6 & ? & GSC 2682.1684 \\
\multicolumn{6}{c}{} & USNO-A1.0 1200.14212791 \\
MisV0129 & 21 55 46.94 & +56 12 36.9 & 14.0 & 15.7 & ? & USNO-A1.0 1425.12660249 \\
MisV0130 & 19 02 25.63 & $-$00 30 14.5 & 10.8 & 12.0 & ? & USNO-A1.0 0825.14192122 \\
\multicolumn{6}{c}{} & IRAS 18598-0034 \\
\multicolumn{6}{c}{} & HS 1332 \\
MisV0131 & 18 01 45.22 & $-$31 20 04.3 & 12.0 & 12.8 & ? & IRAS 17585-3120 \\
MisV0132 & 17 59 07.42 & $-$29 30 27.3 & 11.8 & 13.0 & SR? & IRAS 17559-2930 \\
MisV0133 & 18 57 49.93 & +20 31 37.1 & 13.0 & 14.2 & ? & USNO-A1.0 1050.12598950 \\
\multicolumn{6}{c}{} & IRAS 18556+2027 \\
MisV0134 & 19 01 38.64 & +15 43 08.0 & 13.5 & 14.4 & ? & IRAS 18593+1538 \\
MisV0135 & 18 58 52.63 & $-$09 41 06.6 & 11.5 & 12.7 & SR? & IRAS 18561-0945 \\
MisV0136 & 18 59 29.49 & $-$00 41 55.1 & 12.9 & 14.5 & ? & IRAS 18569-0046 \\
MisV0137 & 18 57 26.66 & $-$03 34 34.3 & 11.8 & 13.5 & SR? & USNO-A1.0 0825.13779108 \\
\multicolumn{6}{c}{} & IRAS 18548-0338 \\
MisV0138 & 19 01 20.23 & $-$01 24 12.1 & 12.2 & 13.3 & ? & \\
MisV0139 & 18 59 28.17 & $-$04 25 34.2 & 13.8 & 16.5 & ? & \\
MisV0140 & 19 01 08.68 & $-$06 07 52.6 & 12.6 & 13.7 & ? & USNO-A1.0 0825.14092766 \\
MisV0141 & 19 02 15.91 & $-$02 24 16.3 & 13.1 & 15.3 & ? & \\
MisV0142 & 19 00 49.48 & $-$01 53 40.8 & 12.1 & 13.3 & ? & USNO-A1.0 0825.14069645 \\
MisV0143 & 19 00 17.64 & $-$02 02 36.6 & 12.3 & 13.4 & ? & USNO-A1.0 0825.14031033 \\
MisV0144 & 19 00 29.32 & $-$01 54 50.8 & 12.2 & 13.8 & ? & USNO-A1.0 0825.14046017 \\
MisV0145 & 19 59 37.89 & +22 18 45.1 & 12.8 & 15.2 & ? & USNO-A1.0 1050.16326536 \\
MisV0146 & 19 59 40.42 & +23 44 17.7 & 13.4 & 15.3 & ? & \\
MisV0147 & 19 00 43.07 & $-$07 42 37.2 & 11.9 & 13.6 & ? & USNO-A1.0 0750.16160471 \\
\multicolumn{6}{c}{} & IRAS 18580-0747 \\
MisV0148 & 19 56 56.06 & +44 35 24.2 & 12.6 & 14.0 & ? & \\
MisV0149 & 19 58 08.52 & +30 06 29.3 & 11.1 & 11.9 & SR? & IRAS 19561+2958 \\
MisV0150 & 19 00 27.09 & $-$08 47 52.6 & 11.4 & 12.6 & ? & USNO-A1.0 0750.16135617 \\
\multicolumn{6}{c}{} & IRAS 18577-0852 \\
\hline
\end{tabular}
\end{center}
\end{table}

%Delete it for printing with the old IBVS style file
\medskip
\IBVSetable{4770-t1.tex}
%

\end{document}

